IEEE_VIC.PIC (C) 31.7.1999 Woll

In BOut B

Bus B

61D157PA0

PB0210In COut C

Bus C

102D2119PA1

PB1311In DOut D

Bus D

143D31315PA2

PB2412In A

PA3Out A

Bus A

24D431PB3

513In BOut B

613D557PA4

PB4614In COut C

1014D6119PA5

PB5715In DOut D

1415D71315PA6

PB6816In A

PA7Out A

216D831PB7

91710SRQ

CB1185EOICB2192k45k11213CA239In DOut D

1411ATN

1315PB3PB71317In BOut B

6DAV

57PB0PB41014In COut C

107NRFD

119PB1PB5

1115In A

PA2Out A

28NDAC

31PB6121617RENEna ABC

Ena D

Ena ABC VCC GND 164128124169IFC2k45k121Ena ABC

16412818...24

12Shield

20VCC

20654VPP

CE2118OE20210938D0...D7

A0...A3

D0...D7

A0...A3

131211D0...D7

RS0...RS3 CS1

A4

A0...A10

D0...D7

2438...35

33...26

CS223IRQ25O222R/W

21RES34CS124CS223IRQ25O222R/W

21RES34D0...D7

38...35

1GND

12GNDU2: 2516

24VCCU5: 6522

U4: 6522

U6: MC3446

U7: MC3446

U8: MC3446

I/O2IRQO2R/WRESTV1819XA11BLK5

A12R13IEEE-488

connector

VIC20

expansion port

PVIC-1112:

IEEE-488

INTERFACE for VIC20

CARTRIDGE /